\doxysection{E\+:/.WORK/\+STM32/\+STM32\+\_\+\+Extended\+Libs/\+My\+Libs\+General/\+Inc/mylibs\+\_\+include.h File Reference}
\hypertarget{mylibs__include_8h}{}\label{mylibs__include_8h}\index{E:/.WORK/STM32/STM32\_ExtendedLibs/MyLibsGeneral/Inc/mylibs\_include.h@{E:/.WORK/STM32/STM32\_ExtendedLibs/MyLibsGeneral/Inc/mylibs\_include.h}}


Заголочный файл для всех библиотек  


{\ttfamily \#include "{}mylibs\+\_\+defs.\+h"{}}\newline
{\ttfamily \#include "{}math.\+h"{}}\newline
{\ttfamily \#include "{}bit\+\_\+access.\+h"{}}\newline
{\ttfamily \#include "{}trackers.\+h"{}}\newline
{\ttfamily \#include "{}trace.\+h"{}}\newline
{\ttfamily \#include "{}evolve\+\_\+optimizer.\+h"{}}\newline
{\ttfamily \#include "{}\+\_\+\+\_\+general\+\_\+flash.\+h"{}}\newline
{\ttfamily \#include "{}general\+\_\+gpio.\+h"{}}\newline
{\ttfamily \#include "{}general\+\_\+tim.\+h"{}}\newline
Include dependency graph for mylibs\+\_\+include.\+h\+:
\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=350pt]{mylibs__include_8h__incl}
\end{center}
\end{figure}


\doxysubsection{Detailed Description}
Заголочный файл для всех библиотек 

Здесь нужно собрать библиотеки и дефайны, которые должны быть видны во всем проекте, чтобы не подключать 100 инклюдов в каждом "{}.\+c"{} файле 

Definition in file \mbox{\hyperlink{mylibs__include_8h_source}{mylibs\+\_\+include.\+h}}.

